;
; Definition file of 
; Automatic generated by gendef
; written by Kai Tietz 2008-2014
;
LIBRARY "Whealogr.dll"
EXPORTS
WdiDiagnosticModuleMain
WdiGetDiagnosticModuleInterfaceVersion
WdiHandleInstance
t10 DATA
t11 DATA
t12 DATA
t13 DATA
t14 DATA
t15 DATA
t16 DATA
t17 DATA
t18 DATA
t19 DATA
t2 DATA
t2.m1
t20 DATA
t21 DATA
t22 DATA
t23 DATA
t24 DATA
t25 DATA
t26 DATA
t27 DATA
t28 DATA
t3 DATA
t30 DATA
t31 DATA
t32 DATA
t33 DATA
t34 DATA
t36 DATA
t37 DATA
t38 DATA
t39 DATA
t4 DATA
t40 DATA
t41 DATA
t42 DATA
t43 DATA
t44 DATA
t45 DATA
t46 DATA
t47 DATA
t48 DATA
t49 DATA
t5 DATA
t50 DATA
t51 DATA
t52 DATA
t53 DATA
t54 DATA
t55 DATA
t56 DATA
t57 DATA
t58 DATA
t59 DATA
t6 DATA
t60 DATA
t61 DATA
t62 DATA
t63 DATA
t64 DATA
t65 DATA
t66 DATA
t67 DATA
t68 DATA
t69 DATA
t7 DATA
t71 DATA
t72 DATA
t72.m0
t72.m1
t72.m2
t72.m3
t72.m4
t72.m5
t72.m6
t73 DATA
t74 DATA
t74.m1
t75 DATA
t75.m1
t76 DATA
t76.m1
t77 DATA
t77.m1
t78 DATA
t78.m1
t79 DATA
t79.m1
t8 DATA
t80 DATA
t80.m10
t81 DATA
t81.m0
t82 DATA
t82.m9
t83 DATA
t84 DATA
t85 DATA
t86 DATA
t87 DATA
t88 DATA
t89 DATA
t9 DATA
t90 DATA
t91 DATA
t92 DATA
t93 DATA
t93.m3
