;
; Definition file of GPAPI.dll
; Automatic generated by gendef
; written by Kai Tietz 2008-2014
;
LIBRARY "GPAPI.dll"
EXPORTS
ord_107 @107
AreThereVisibleLogoffScriptsInternalWorker
ord_109 @109
ord_110 @110
AreThereVisibleShutdownScriptsInternalWorker
EnterCriticalPolicySectionExStub
ord_113 @113
ord_114 @114
ord_115 @115
ord_116 @116
EnterCriticalPolicySectionInternalWorker
FreeGPOListInternalAWorker
GenerateGPNotificationInternalWorker
GetAppliedGPOListInternalAWorker
GetAppliedGPOListInternalWWorker
GetGPOListInternalAWorker
GetGPOListInternalWWorker
HasPolicyForegroundProcessingCompletedInternalWorker
LeaveCriticalPolicySectionInternalWorker
RefreshPolicyExInternalWorker
RefreshPolicyInternalWorker
RegisterGPNotificationInternalWorker
RsopLoggingEnabledInternalWorker
UnregisterGPNotificationInternalWorker
AreThereVisibleLogoffScriptsInternal
AreThereVisibleShutdownScriptsInternal
EnterCriticalPolicySectionInternal
ForceSyncFgPolicyInternal
ForceSyncFgPolicyInternalWorker
FreeGPOListInternalA
FreeGPOListInternalW
FreeGPOListInternalWWorker
GenerateGPNotificationInternal
GetAppliedGPOListInternalA
GetAppliedGPOListInternalW
GetGPOListInternalA
GetGPOListInternalW
GetNextFgPolicyRefreshInfoInternal
GetNextFgPolicyRefreshInfoInternalWorker
GetPreviousFgPolicyRefreshInfoInternal
GetPreviousFgPolicyRefreshInfoInternalWorker
HasPolicyForegroundProcessingCompletedInternal
IsSyncForegroundPolicyRefreshWorker
LeaveCriticalPolicySectionInternal
RefreshPolicyExInternal
RefreshPolicyInternal
RegisterGPNotificationInternal
RsopLoggingEnabledInternal
UnregisterGPNotificationInternal
WaitForMachinePolicyForegroundProcessingInternal
WaitForMachinePolicyForegroundProcessingInternalWorker
WaitForUserPolicyForegroundProcessingInternal
WaitForUserPolicyForegroundProcessingInternalWorker
