;
; Definition file of FVEAPIBASE.dll
; Automatic generated by gendef
; written by Kai Tietz 2008-2014
;
LIBRARY "FVEAPIBASE.dll"
EXPORTS
InternalFveIsVolumeEncrypted
FveAuthElementFromPassPhraseW
FveAuthElementFromPinW
FveAuthElementFromRecoveryPasswordW
FveAuthElementGetKeyFileNameW
FveAuthElementReadExternalKeyW
FveAuthElementToRecoveryPasswordW
FveAuthElementWriteExternalKeyW
FveClearUserFlags
FveCloseHandle
FveCloseVolume
FveCommitChanges
FveConversionDecrypt
FveConversionDecryptEx
FveConversionPause
FveConversionResume
FveConversionStop
FveConversionStopEx
FveDiscardChanges
FveEnableRawAccess
FveEraseDrive
FveFindFirstVolume
FveFindNextVolume
FveGetAllowKeyExport
FveGetAuthMethodGuids
FveGetAuthMethodInformation
FveGetDataSet
FveGetFipsAllowDisabled
FveGetFveMethod
FveGetFveMethodEDrv
FveGetIdentity
FveGetKeyPackage
FveGetStatus
FveGetStatusW
FveGetUserFlags
FveGetVolumeNameW
FveIsHardwareReadyForConversion
FveIsRecoveryPasswordGroupValidW
FveIsRecoveryPasswordValidW
FveIsVolumeEncryptable
FveLockVolume
FveNotifyVolumeAfterFormat
FveOpenVolumeByHandle
FveOpenVolumeExW
FveOpenVolumeW
FveQuery
FveRevertVolume
FveSetAllowKeyExport
FveSetFipsAllowDisabled
FveSetFveMethod
FveSetUserFlags
FveUpgradeVolume
