LIBRARY api-ms-win-crt-heap-l1-1-0

EXPORTS

_aligned_free
_aligned_malloc
_aligned_msize
_aligned_offset_malloc
_aligned_offset_realloc
_aligned_offset_recalloc
_aligned_realloc
_aligned_recalloc
_callnewh
_calloc_base
_expand
_free_base
_get_heap_handle
_heapchk
_heapmin
_heapwalk
heapwalk == _heapwalk
_malloc_base
_msize
_query_new_handler
_query_new_mode
_realloc_base
_recalloc
_set_new_mode
calloc
free
malloc
realloc
