;
; Definition file of HAL.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "HAL.dll"
EXPORTS
HalAcquireDisplayOwnership
HalAdjustResourceList
HalAllProcessorsStarted
HalAllocateAdapterChannel
HalAllocateCommonBuffer
HalAllocateCrashDumpRegisters
HalAllocateHardwareCounters
HalAssignSlotResources
HalBugCheckSystem
HalCalibratePerformanceCounter
HalCallBios
HalClearSoftwareInterrupt
HalDisableSystemInterrupt
HalConvertDeviceIdtToIrql
HalDisableInterrupt
HalDisplayString
HalEnableSystemInterrupt
HalEnableInterrupt
HalEnumerateEnvironmentVariablesEx
HalEnumerateProcessors
HalFlushCommonBuffer
HalFreeCommonBuffer
HalFreeHardwareCounters
HalGetAdapter
HalGetBusData
HalGetBusDataByOffset
HalGetEnvironmentVariable
HalGetEnvironmentVariableEx
HalGetInterruptTargetInformation
HalGetInterruptVector
HalGetMemoryCachingRequirements
HalGetMessageRoutingInfo
HalGetProcessorIdByNtNumber
HalGetVectorInput
HalHandleMcheck
HalHandleNMI
HalInitSystem
HalInitializeBios
HalInitializeOnResume
HalInitializeProcessor
HalIsHyperThreadingEnabled
HalMakeBeep
HalMcUpdateReadPCIConfig
HalPerformEndOfInterrupt DATA
HalProcessorIdle
HalQueryDisplayParameters
HalQueryEnvironmentVariableInfoEx
HalQueryMaximumProcessorCount
HalQueryRealTimeClock
HalReadDmaCounter
HalRegisterDynamicProcessor
HalRegisterErrataCallbacks
HalReportResourceUsage
HalRequestClockInterrupt
HalRequestDeferredRecoveryServiceInterrupt
HalRequestIpi
HalRequestSoftwareInterrupt
HalReturnToFirmware
HalSendNMI
HalSendSoftwareInterrupt
HalSetBusData
HalSetBusDataByOffset
HalSetDisplayParameters
HalSetEnvironmentVariable
HalSetEnvironmentVariableEx
HalSetProfileInterval
HalSetRealTimeClock
HalSetTimeIncrement
HalStartDynamicProcessor
HalStartNextProcessor
HalStartProfileInterrupt
HalStopProfileInterrupt
HalSystemVectorDispatchEntry
HalTranslateBusAddress
IoAssignDriveLetters
IoFlushAdapterBuffers
IoFreeAdapterChannel
IoFreeMapRegisters
IoMapTransfer
IoReadPartitionTable
IoSetPartitionInformation
IoWritePartitionTable
KdComPortInUse DATA
KeFlushWriteBuffer
KeQueryPerformanceCounter
KeStallExecutionProcessor
x86BiosExecuteInterrupt
x86BiosInitializeBiosEx
x86BiosTranslateAddress
x86BiosAllocateBuffer
x86BiosCall
x86BiosFreeBuffer
x86BiosReadMemory
x86BiosWriteMemory
