;
; Definition file of USBD.SYS
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "USBD.SYS"
EXPORTS
USBD_CreateConfigurationRequestEx@8
USBD_ParseConfigurationDescriptorEx@28
USBD_ParseDescriptors@16
DllInitialize@4
DllUnload@0
USBD_AllocateDeviceName@4
USBD_CalculateUsbBandwidth@12
USBD_CompleteRequest@8
USBD_CreateConfigurationRequest@8
USBD_CreateDevice@20
USBD_Debug_GetHeap@16
USBD_Debug_LogEntry@16
USBD_Debug_RetHeap@12
USBD_Dispatch@16
USBD_FreeDeviceMutex@4
USBD_FreeDeviceName@4
USBD_GetDeviceInformation@12
USBD_GetInterfaceLength@8
USBD_GetPdoRegistryParameter@20
USBD_GetSuspendPowerState@4
USBD_GetUSBDIVersion@4
USBD_InitializeDevice@24
USBD_MakePdoName@8
USBD_ParseConfigurationDescriptor@12
USBD_QueryBusTime@8
USBD_RegisterHcDeviceCapabilities@12
USBD_RegisterHcFilter@8
USBD_RegisterHostController@40
USBD_RemoveDevice@12
USBD_RestoreDevice@12
USBD_SetSuspendPowerState@8
USBD_WaitDeviceMutex@4
