;
; Definition file of pdh.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "pdh.dll"
EXPORTS
PdhAdd009CounterA@16
PdhAdd009CounterW@16
PdhAddCounterA@16
PdhAddCounterW@16
PdhAddEnglishCounterA@16
PdhAddEnglishCounterW@16
PdhAddRelogCounter@28
PdhBindInputDataSourceA@8
PdhBindInputDataSourceW@8
PdhBrowseCountersA@4
PdhBrowseCountersHA@4
PdhBrowseCountersHW@4
PdhBrowseCountersW@4
PdhCalculateCounterFromRawValue@20
PdhCloseLog@8
PdhCloseQuery@4
PdhCollectQueryData@4
PdhCollectQueryDataEx@12
PdhCollectQueryDataWithTime@8
PdhComputeCounterStatistics@24
PdhConnectMachineA@4
PdhConnectMachineW@4
PdhCreateSQLTablesA@4
PdhCreateSQLTablesW@4
PdhEnumLogSetNamesA@12
PdhEnumLogSetNamesW@12
PdhEnumMachinesA@12
PdhEnumMachinesHA@12
PdhEnumMachinesHW@12
PdhEnumMachinesW@12
PdhEnumObjectItemsA@36
PdhEnumObjectItemsHA@36
PdhEnumObjectItemsHW@36
PdhEnumObjectItemsW@36
PdhEnumObjectsA@24
PdhEnumObjectsHA@24
PdhEnumObjectsHW@24
PdhEnumObjectsW@24
PdhExpandCounterPathA@12
PdhExpandCounterPathW@12
PdhExpandWildCardPathA@20
PdhExpandWildCardPathHA@20
PdhExpandWildCardPathHW@20
PdhExpandWildCardPathW@20
PdhFormatFromRawValue@24
PdhGetCounterInfoA@16
PdhGetCounterInfoW@16
PdhGetCounterTimeBase@8
PdhGetDataSourceTimeRangeA@16
PdhGetDataSourceTimeRangeH@16
PdhGetDataSourceTimeRangeW@16
PdhGetDefaultPerfCounterA@20
PdhGetDefaultPerfCounterHA@20
PdhGetDefaultPerfCounterHW@20
PdhGetDefaultPerfCounterW@20
PdhGetDefaultPerfObjectA@16
PdhGetDefaultPerfObjectHA@16
PdhGetDefaultPerfObjectHW@16
PdhGetDefaultPerfObjectW@16
PdhGetDllVersion@4
PdhGetExplainText@12
PdhGetFormattedCounterArrayA@20
PdhGetFormattedCounterArrayW@20
PdhGetFormattedCounterValue@16
PdhGetLogFileSize@8
PdhGetLogFileTypeA@8
PdhGetLogFileTypeW@8
PdhGetLogSetGUID@12
PdhGetRawCounterArrayA@16
PdhGetRawCounterArrayW@16
PdhGetRawCounterValue@12
PdhIsRealTimeQuery@4
PdhListLogFileHeaderA@12
PdhListLogFileHeaderW@12
PdhLookupPerfIndexByNameA@12
PdhLookupPerfIndexByNameW@12
PdhLookupPerfNameByIndexA@16
PdhLookupPerfNameByIndexW@16
PdhMakeCounterPathA@16
PdhMakeCounterPathW@16
PdhOpenLogA@28
PdhOpenLogW@28
PdhOpenQuery@12
PdhOpenQueryA@12
PdhOpenQueryH@12
PdhOpenQueryW@12
PdhParseCounterPathA@16
PdhParseCounterPathW@16
PdhParseInstanceNameA@24
PdhParseInstanceNameW@24
PdhReadRawLogRecord@20
PdhRelogA@8
PdhRelogW@8
PdhRemoveCounter@4
PdhResetRelogCounterValues@4
PdhSelectDataSourceA@16
PdhSelectDataSourceW@16
PdhSetCounterScaleFactor@8
PdhSetCounterValue@12
PdhSetDefaultRealTimeDataSource@4
PdhSetLogSetRunID@8
PdhSetQueryTimeRange@8
PdhTranslate009CounterA@12
PdhTranslate009CounterW@12
PdhTranslateLocaleCounterA@12
PdhTranslateLocaleCounterW@12
PdhUpdateLogA@8
PdhUpdateLogFileCatalog@4
PdhUpdateLogW@8
PdhValidatePathA@4
PdhValidatePathExA@8
PdhValidatePathExW@8
PdhValidatePathW@4
PdhVbAddCounter@12
PdhVbCreateCounterPathList@8
PdhVbGetCounterPathElements@28
PdhVbGetCounterPathFromList@12
PdhVbGetDoubleCounterValue@8
PdhVbGetLogFileSize@8
PdhVbGetOneCounterPath@16
PdhVbIsGoodStatus@4
PdhVbOpenLog@28
PdhVbOpenQuery@4
PdhVbUpdateLog@8
PdhVerifySQLDBA@4
PdhVerifySQLDBW@4
PdhWriteRelogSample@12
PdhpGetLoggerName@16
