; library name is libhtmlhelp.a but
; functions exported from hhcrtl.ocx

LIBRARY "hhctrl.ocx"
EXPORTS
LoadHHA@8
DllCanUnloadNow@0
AuthorMsg@16
DllGetClassObject@12
DllRegisterServer@0
DllUnregisterServer@0
doWinMain@8
HtmlHelpA@16
HtmlHelpW@16
HhWindowThread@4
